/*
 Navicat Premium Data Transfer

 Source Server         : 172.16.12.105
 Source Server Type    : PostgreSQL
 Source Server Version : 140007 (140007)
 Source Host           : 172.16.12.105:5432
 Source Catalog        : data_asset
 Source Schema         : public

 Target Server Type    : PostgreSQL
 Target Server Version : 140007 (140007)
 File Encoding         : 65001

 Date: 28/06/2023 15:19:16
*/


-- ----------------------------
-- Sequence structure for seq_sys_config
-- ----------------------------
-- DROP SEQUENCE IF EXISTS "public"."seq_sys_config";
CREATE SEQUENCE "public"."seq_sys_config" 
INCREMENT 1
MINVALUE  1
MAXVALUE 9223372036854775807
START 4
CACHE 1;

-- ----------------------------
-- Sequence structure for seq_sys_dept
-- ----------------------------
-- DROP SEQUENCE IF EXISTS "public"."seq_sys_dept";
CREATE SEQUENCE "public"."seq_sys_dept" 
INCREMENT 1
MINVALUE  1
MAXVALUE 9223372036854775807
START 3
CACHE 1;

-- ----------------------------
-- Sequence structure for seq_sys_dict_data
-- ----------------------------
-- DROP SEQUENCE IF EXISTS "public"."seq_sys_dict_data";
CREATE SEQUENCE "public"."seq_sys_dict_data" 
INCREMENT 1
MINVALUE  1
MAXVALUE 9223372036854775807
START 1
CACHE 1;

-- ----------------------------
-- Sequence structure for seq_sys_dict_type
-- ----------------------------
-- DROP SEQUENCE IF EXISTS "public"."seq_sys_dict_type";
CREATE SEQUENCE "public"."seq_sys_dict_type" 
INCREMENT 1
MINVALUE  1
MAXVALUE 9223372036854775807
START 1
CACHE 1;

-- ----------------------------
-- Sequence structure for seq_sys_job
-- ----------------------------
-- DROP SEQUENCE IF EXISTS "public"."seq_sys_job";
CREATE SEQUENCE "public"."seq_sys_job" 
INCREMENT 1
MINVALUE  1
MAXVALUE 9223372036854775807
START 1
CACHE 1;

-- ----------------------------
-- Sequence structure for seq_sys_job_log
-- ----------------------------
-- DROP SEQUENCE IF EXISTS "public"."seq_sys_job_log";
CREATE SEQUENCE "public"."seq_sys_job_log" 
INCREMENT 1
MINVALUE  1
MAXVALUE 9223372036854775807
START 1
CACHE 1;

-- ----------------------------
-- Sequence structure for seq_sys_logininfor
-- ----------------------------
-- DROP SEQUENCE IF EXISTS "public"."seq_sys_logininfor";
CREATE SEQUENCE "public"."seq_sys_logininfor" 
INCREMENT 1
MINVALUE  1
MAXVALUE 9223372036854775807
START 1
CACHE 1;

-- ----------------------------
-- Sequence structure for seq_sys_menu
-- ----------------------------
-- DROP SEQUENCE IF EXISTS "public"."seq_sys_menu";
CREATE SEQUENCE "public"."seq_sys_menu" 
INCREMENT 1
MINVALUE  1
MAXVALUE 9223372036854775807
START 3000
CACHE 1;

-- ----------------------------
-- Sequence structure for seq_sys_notice
-- ----------------------------
-- DROP SEQUENCE IF EXISTS "public"."seq_sys_notice";
CREATE SEQUENCE "public"."seq_sys_notice" 
INCREMENT 1
MINVALUE  1
MAXVALUE 9223372036854775807
START 1
CACHE 1;

-- ----------------------------
-- Sequence structure for seq_sys_oper_log
-- ----------------------------
-- DROP SEQUENCE IF EXISTS "public"."seq_sys_oper_log";
CREATE SEQUENCE "public"."seq_sys_oper_log" 
INCREMENT 1
MINVALUE  1
MAXVALUE 9223372036854775807
START 1
CACHE 1;

-- ----------------------------
-- Sequence structure for seq_sys_post
-- ----------------------------
-- DROP SEQUENCE IF EXISTS "public"."seq_sys_post";
CREATE SEQUENCE "public"."seq_sys_post" 
INCREMENT 1
MINVALUE  1
MAXVALUE 9223372036854775807
START 1
CACHE 1;

-- ----------------------------
-- Sequence structure for seq_sys_role
-- ----------------------------
-- DROP SEQUENCE IF EXISTS "public"."seq_sys_role";
CREATE SEQUENCE "public"."seq_sys_role" 
INCREMENT 1
MINVALUE  1
MAXVALUE 9223372036854775807
START 3
CACHE 1;

-- ----------------------------
-- Sequence structure for seq_sys_user
-- ----------------------------
-- DROP SEQUENCE IF EXISTS "public"."seq_sys_user";
CREATE SEQUENCE "public"."seq_sys_user" 
INCREMENT 1
MINVALUE  1
MAXVALUE 9223372036854775807
START 2
CACHE 1;

-- ----------------------------
-- Sequence structure for seq_sys_warning_contact
-- ----------------------------
-- DROP SEQUENCE IF EXISTS "public"."seq_sys_warning_contact";
CREATE SEQUENCE "public"."seq_sys_warning_contact" 
INCREMENT 1
MINVALUE  1
MAXVALUE 9223372036854775807
START 1
CACHE 1;

-- ----------------------------
-- Sequence structure for seq_sys_warning_log
-- ----------------------------
-- DROP SEQUENCE IF EXISTS "public"."seq_sys_warning_log";
CREATE SEQUENCE "public"."seq_sys_warning_log" 
INCREMENT 1
MINVALUE  1
MAXVALUE 9223372036854775807
START 1
CACHE 1;

-- ----------------------------
-- Sequence structure for tbl_data_table_index_id_seq
-- ----------------------------
-- DROP SEQUENCE IF EXISTS "public"."tbl_data_table_index_id_seq";
CREATE SEQUENCE "public"."tbl_data_table_index_id_seq" 
INCREMENT 1
MINVALUE  1
MAXVALUE 9223372036854775807
START 1
CACHE 1;

-- ----------------------------
-- Table structure for tbl_data_table
-- ----------------------------
-- DROP TABLE IF EXISTS "public"."tbl_data_table";
CREATE TABLE "public"."tbl_data_table" (
  "table_id" varchar(64) COLLATE "pg_catalog"."default" NOT NULL,
  "table_name" varchar(200) COLLATE "pg_catalog"."default" NOT NULL,
  "chinese_name" varchar(200) COLLATE "pg_catalog"."default",
  "business_type" varchar(2) COLLATE "pg_catalog"."default" NOT NULL,
  "businne_scenario
" varchar(2) COLLATE "pg_catalog"."default" NOT NULL,
  "from" varchar(255) COLLATE "pg_catalog"."default" NOT NULL,
  "table_type" varchar(2) COLLATE "pg_catalog"."default" NOT NULL,
  "store_model" varchar(20) COLLATE "pg_catalog"."default" NOT NULL,
  "system_name " varchar(200) COLLATE "pg_catalog"."default" NOT NULL,
  "store_space" numeric(12,4),
  "update_frequency" varchar(2) COLLATE "pg_catalog"."default",
  "add_num" numeric(16,0),
  "data_type" varchar(2) COLLATE "pg_catalog"."default",
  "supply_way" varchar(10) COLLATE "pg_catalog"."default",
  "if_sensitivity" char(1) COLLATE "pg_catalog"."default",
  "if_have_personal_info" char(1) COLLATE "pg_catalog"."default",
  "if_backup" char(1) COLLATE "pg_catalog"."default",
  "create_table_time" time(6),
  "terminal_time" timestamp(6),
  "open_type" varchar(2) COLLATE "pg_catalog"."default",
  "desc" varchar(1024) COLLATE "pg_catalog"."default",
  "remark" varchar(300) COLLATE "pg_catalog"."default",
  "status" varchar(2) COLLATE "pg_catalog"."default",
  "create_by" varchar(100) COLLATE "pg_catalog"."default" NOT NULL,
  "create_time" timestamp(6),
  "update_by" varchar(100) COLLATE "pg_catalog"."default",
  "update_time" timestamp(6) DEFAULT CURRENT_TIMESTAMP,
  "version_num" int8 DEFAULT 0,
  "del_flag" char(1) COLLATE "pg_catalog"."default",
  "rec_token" varchar(64) COLLATE "pg_catalog"."default"
)
;
COMMENT ON COLUMN "public"."tbl_data_table"."table_id" IS '数据编号';
COMMENT ON COLUMN "public"."tbl_data_table"."table_name" IS '表名';
COMMENT ON COLUMN "public"."tbl_data_table"."chinese_name" IS '中文名称';
COMMENT ON COLUMN "public"."tbl_data_table"."business_type" IS '业务类型：01-主数据；0-2交易类数据；03-指标类数据';
COMMENT ON COLUMN "public"."tbl_data_table"."businne_scenario
" IS '业务场景：01-交通；02-体育；03-投资；04-置业；05-文化；06-旅游；99-其他';
COMMENT ON COLUMN "public"."tbl_data_table"."from" IS '来源企业';
COMMENT ON COLUMN "public"."tbl_data_table"."table_type" IS '表类型： 01-单表；02-集合表';
COMMENT ON COLUMN "public"."tbl_data_table"."store_model" IS '本地储存方式:oracle-orcle、mysql-mysql、sqlserver-sqlserver、hive-hive、hbase-hbase、other-其他';
COMMENT ON COLUMN "public"."tbl_data_table"."system_name " IS '此表所在系统名称';
COMMENT ON COLUMN "public"."tbl_data_table"."store_space" IS '此数据资源目前存储总量';
COMMENT ON COLUMN "public"."tbl_data_table"."update_frequency" IS '更新频率： 01-实时；02-每日；03-每周；04-每月；05-每年；06-不定期';
COMMENT ON COLUMN "public"."tbl_data_table"."add_num" IS '新增数据条数，时间单位与更新频率一致,如1200万条/天';
COMMENT ON COLUMN "public"."tbl_data_table"."data_type" IS '数据资源类型: 01-结构化数据；02-非结构化数据';
COMMENT ON COLUMN "public"."tbl_data_table"."supply_way" IS '数据提供方式： csv-CSV;xls-XLS; json-JSON; xml-XML;rdf-RDFapi-接口;other-其他';
COMMENT ON COLUMN "public"."tbl_data_table"."if_sensitivity" IS '是否敏感： 0-否；1-是';
COMMENT ON COLUMN "public"."tbl_data_table"."if_have_personal_info" IS '是否含有个人敏感信息： 0-否；1-是';
COMMENT ON COLUMN "public"."tbl_data_table"."if_backup" IS '是否备份： 0-否；1-是';
COMMENT ON COLUMN "public"."tbl_data_table"."create_table_time" IS '建表时间';
COMMENT ON COLUMN "public"."tbl_data_table"."terminal_time" IS '终止时间';
COMMENT ON COLUMN "public"."tbl_data_table"."open_type" IS '开放方式： 01-无条件开发；02-条件开发；0-3不予开放';
COMMENT ON COLUMN "public"."tbl_data_table"."desc" IS '描述';
COMMENT ON COLUMN "public"."tbl_data_table"."remark" IS '备注';
COMMENT ON COLUMN "public"."tbl_data_table"."status" IS '数据状态： 01-草稿；02-上架；03-下架';
COMMENT ON COLUMN "public"."tbl_data_table"."create_by" IS '创建人';
COMMENT ON COLUMN "public"."tbl_data_table"."create_time" IS '创建时间';
COMMENT ON COLUMN "public"."tbl_data_table"."update_by" IS '更新人';
COMMENT ON COLUMN "public"."tbl_data_table"."update_time" IS '更新时间';
COMMENT ON COLUMN "public"."tbl_data_table"."version_num" IS '版本号';
COMMENT ON COLUMN "public"."tbl_data_table"."del_flag" IS '是否删除: 0-否；1-是';
COMMENT ON COLUMN "public"."tbl_data_table"."rec_token" IS '随机码，用来防止并发更新';

-- ----------------------------
-- Table structure for tbl_data_table_index
-- ----------------------------
-- DROP TABLE IF EXISTS "public"."tbl_data_table_index";
CREATE TABLE "public"."tbl_data_table_index" (
  "id" int8 NOT NULL DEFAULT nextval('tbl_data_table_index_id_seq'::regclass),
  "table_id" varchar(64) COLLATE "pg_catalog"."default" NOT NULL,
  "index_code" varchar(30) COLLATE "pg_catalog"."default" NOT NULL
)
;
COMMENT ON COLUMN "public"."tbl_data_table_index"."id" IS '主键';
COMMENT ON COLUMN "public"."tbl_data_table_index"."table_id" IS '表编码';
COMMENT ON COLUMN "public"."tbl_data_table_index"."index_code" IS '指标编码';
COMMENT ON TABLE "public"."tbl_data_table_index" IS '表所属指标';

-- ----------------------------
-- Table structure for tbl_sys_config
-- ----------------------------
-- DROP TABLE IF EXISTS "public"."tbl_sys_config";
CREATE TABLE "public"."tbl_sys_config" (
  "config_id" int8 NOT NULL DEFAULT nextval('seq_sys_config'::regclass),
  "version_num" int4 NOT NULL DEFAULT 0,
  "rec_token" varchar(10) COLLATE "pg_catalog"."default" NOT NULL DEFAULT '1'::character varying,
  "config_name" varchar(100) COLLATE "pg_catalog"."default",
  "config_key" varchar(100) COLLATE "pg_catalog"."default",
  "config_value" varchar(500) COLLATE "pg_catalog"."default",
  "config_type" char(1) COLLATE "pg_catalog"."default",
  "create_by" varchar(64) COLLATE "pg_catalog"."default",
  "create_time" timestamp(6),
  "update_by" varchar(64) COLLATE "pg_catalog"."default",
  "update_time" timestamp(6),
  "remark" varchar(500) COLLATE "pg_catalog"."default"
)
;
COMMENT ON COLUMN "public"."tbl_sys_config"."config_id" IS '【参数主键】';
COMMENT ON COLUMN "public"."tbl_sys_config"."version_num" IS '【版本号】';
COMMENT ON COLUMN "public"."tbl_sys_config"."rec_token" IS '【随机码】';
COMMENT ON COLUMN "public"."tbl_sys_config"."config_name" IS '【参数名称】';
COMMENT ON COLUMN "public"."tbl_sys_config"."config_key" IS '【参数键名】';
COMMENT ON COLUMN "public"."tbl_sys_config"."config_value" IS '【参数键值】';
COMMENT ON COLUMN "public"."tbl_sys_config"."config_type" IS '【系统内置】Y是 N否';
COMMENT ON COLUMN "public"."tbl_sys_config"."create_by" IS '【创建者】';
COMMENT ON COLUMN "public"."tbl_sys_config"."create_time" IS '【创建时间】';
COMMENT ON COLUMN "public"."tbl_sys_config"."update_by" IS '【更新者】';
COMMENT ON COLUMN "public"."tbl_sys_config"."update_time" IS '【更新时间】';
COMMENT ON COLUMN "public"."tbl_sys_config"."remark" IS '【备注】';
COMMENT ON TABLE "public"."tbl_sys_config" IS '【参数配置表】';

-- ----------------------------
-- Table structure for tbl_sys_dept
-- ----------------------------
-- DROP TABLE IF EXISTS "public"."tbl_sys_dept";
CREATE TABLE "public"."tbl_sys_dept" (
  "dept_id" int8 NOT NULL DEFAULT nextval('seq_sys_dept'::regclass),
  "version_num" int4 NOT NULL DEFAULT 0,
  "rec_token" varchar(10) COLLATE "pg_catalog"."default" NOT NULL DEFAULT '1'::character varying,
  "parent_id" int8,
  "ancestors" varchar(50) COLLATE "pg_catalog"."default",
  "dept_name" varchar(30) COLLATE "pg_catalog"."default" NOT NULL,
  "order_num" int4,
  "leader" varchar(20) COLLATE "pg_catalog"."default",
  "phone" varchar(11) COLLATE "pg_catalog"."default",
  "email" varchar(50) COLLATE "pg_catalog"."default",
  "status" char(1) COLLATE "pg_catalog"."default",
  "del_flag" char(1) COLLATE "pg_catalog"."default" DEFAULT '0'::bpchar,
  "create_by" varchar(64) COLLATE "pg_catalog"."default",
  "create_time" timestamp(6),
  "update_by" varchar(64) COLLATE "pg_catalog"."default",
  "update_time" timestamp(6)
)
;
COMMENT ON COLUMN "public"."tbl_sys_dept"."dept_id" IS '【部门id】';
COMMENT ON COLUMN "public"."tbl_sys_dept"."version_num" IS '【版本号】';
COMMENT ON COLUMN "public"."tbl_sys_dept"."rec_token" IS '【随机码】';
COMMENT ON COLUMN "public"."tbl_sys_dept"."parent_id" IS '【父部门id】';
COMMENT ON COLUMN "public"."tbl_sys_dept"."ancestors" IS '【祖级列表】';
COMMENT ON COLUMN "public"."tbl_sys_dept"."dept_name" IS '【部门名称】';
COMMENT ON COLUMN "public"."tbl_sys_dept"."order_num" IS '【显示顺序】';
COMMENT ON COLUMN "public"."tbl_sys_dept"."leader" IS '【负责人】';
COMMENT ON COLUMN "public"."tbl_sys_dept"."phone" IS '【联系电话】';
COMMENT ON COLUMN "public"."tbl_sys_dept"."email" IS '【邮箱】';
COMMENT ON COLUMN "public"."tbl_sys_dept"."status" IS '【部门状态】0正常 1停用';
COMMENT ON COLUMN "public"."tbl_sys_dept"."del_flag" IS '【删除标志】0代表存在 2代表删除';
COMMENT ON COLUMN "public"."tbl_sys_dept"."create_by" IS '【创建者】';
COMMENT ON COLUMN "public"."tbl_sys_dept"."create_time" IS '【创建时间】';
COMMENT ON COLUMN "public"."tbl_sys_dept"."update_by" IS '【更新者】';
COMMENT ON COLUMN "public"."tbl_sys_dept"."update_time" IS '【更新时间】';
COMMENT ON TABLE "public"."tbl_sys_dept" IS '【部门表】';

-- ----------------------------
-- Table structure for tbl_sys_dict_data
-- ----------------------------
-- DROP TABLE IF EXISTS "public"."tbl_sys_dict_data";
CREATE TABLE "public"."tbl_sys_dict_data" (
  "dict_code" int8 NOT NULL DEFAULT nextval('seq_sys_dict_data'::regclass),
  "version_num" int4 NOT NULL DEFAULT 0,
  "rec_token" varchar(10) COLLATE "pg_catalog"."default" NOT NULL DEFAULT '1'::character varying,
  "dict_sort" int4,
  "dict_label" varchar(100) COLLATE "pg_catalog"."default",
  "dict_value" varchar(100) COLLATE "pg_catalog"."default",
  "dict_type" varchar(100) COLLATE "pg_catalog"."default" NOT NULL,
  "css_class" varchar(100) COLLATE "pg_catalog"."default",
  "list_class" varchar(100) COLLATE "pg_catalog"."default",
  "is_default" char(1) COLLATE "pg_catalog"."default",
  "status" char(1) COLLATE "pg_catalog"."default",
  "create_by" varchar(64) COLLATE "pg_catalog"."default",
  "create_time" timestamp(6),
  "update_by" varchar(64) COLLATE "pg_catalog"."default",
  "update_time" timestamp(6),
  "remark" varchar(500) COLLATE "pg_catalog"."default"
)
;
COMMENT ON COLUMN "public"."tbl_sys_dict_data"."dict_code" IS '【字典编码】';
COMMENT ON COLUMN "public"."tbl_sys_dict_data"."version_num" IS '【版本号】';
COMMENT ON COLUMN "public"."tbl_sys_dict_data"."rec_token" IS '【随机码】';
COMMENT ON COLUMN "public"."tbl_sys_dict_data"."dict_sort" IS '【字典排序】';
COMMENT ON COLUMN "public"."tbl_sys_dict_data"."dict_label" IS '【字典标签】';
COMMENT ON COLUMN "public"."tbl_sys_dict_data"."dict_value" IS '【字典键值】';
COMMENT ON COLUMN "public"."tbl_sys_dict_data"."dict_type" IS '【字典类型】';
COMMENT ON COLUMN "public"."tbl_sys_dict_data"."css_class" IS '【样式属性】其他样式扩展';
COMMENT ON COLUMN "public"."tbl_sys_dict_data"."list_class" IS '【表格回显样式】';
COMMENT ON COLUMN "public"."tbl_sys_dict_data"."is_default" IS '【是否默认】Y是 N否';
COMMENT ON COLUMN "public"."tbl_sys_dict_data"."status" IS '【状态】0正常 1停用';
COMMENT ON COLUMN "public"."tbl_sys_dict_data"."create_by" IS '【创建者】';
COMMENT ON COLUMN "public"."tbl_sys_dict_data"."create_time" IS '【创建时间】';
COMMENT ON COLUMN "public"."tbl_sys_dict_data"."update_by" IS '【更新者】';
COMMENT ON COLUMN "public"."tbl_sys_dict_data"."update_time" IS '【更新时间】';
COMMENT ON COLUMN "public"."tbl_sys_dict_data"."remark" IS '【备注】';
COMMENT ON TABLE "public"."tbl_sys_dict_data" IS '【字典数据表】';

-- ----------------------------
-- Table structure for tbl_sys_dict_type
-- ----------------------------
-- DROP TABLE IF EXISTS "public"."tbl_sys_dict_type";
CREATE TABLE "public"."tbl_sys_dict_type" (
  "dict_id" int8 NOT NULL DEFAULT nextval('seq_sys_dict_type'::regclass),
  "version_num" int4 NOT NULL DEFAULT 0,
  "rec_token" varchar(10) COLLATE "pg_catalog"."default" NOT NULL DEFAULT '1'::character varying,
  "dict_name" varchar(100) COLLATE "pg_catalog"."default",
  "dict_type" varchar(100) COLLATE "pg_catalog"."default" NOT NULL,
  "status" char(1) COLLATE "pg_catalog"."default",
  "create_by" varchar(64) COLLATE "pg_catalog"."default",
  "create_time" timestamp(6),
  "update_by" varchar(64) COLLATE "pg_catalog"."default",
  "update_time" timestamp(6),
  "remark" varchar(500) COLLATE "pg_catalog"."default"
)
;
COMMENT ON COLUMN "public"."tbl_sys_dict_type"."dict_id" IS '【字典主键】';
COMMENT ON COLUMN "public"."tbl_sys_dict_type"."version_num" IS '【版本号】';
COMMENT ON COLUMN "public"."tbl_sys_dict_type"."rec_token" IS '【随机码】';
COMMENT ON COLUMN "public"."tbl_sys_dict_type"."dict_name" IS '【字典名称】';
COMMENT ON COLUMN "public"."tbl_sys_dict_type"."dict_type" IS '【字典类型】';
COMMENT ON COLUMN "public"."tbl_sys_dict_type"."status" IS '【状态】0正常 1停用';
COMMENT ON COLUMN "public"."tbl_sys_dict_type"."create_by" IS '【创建者】';
COMMENT ON COLUMN "public"."tbl_sys_dict_type"."create_time" IS '【创建时间】';
COMMENT ON COLUMN "public"."tbl_sys_dict_type"."update_by" IS '【更新者】';
COMMENT ON COLUMN "public"."tbl_sys_dict_type"."update_time" IS '【更新时间】';
COMMENT ON COLUMN "public"."tbl_sys_dict_type"."remark" IS '【备注】';
COMMENT ON TABLE "public"."tbl_sys_dict_type" IS '【字典类型表】';

-- ----------------------------
-- Table structure for tbl_sys_job
-- ----------------------------
-- DROP TABLE IF EXISTS "public"."tbl_sys_job";
CREATE TABLE "public"."tbl_sys_job" (
  "job_id" int8 NOT NULL DEFAULT nextval('seq_sys_job'::regclass),
  "job_name" varchar(64) COLLATE "pg_catalog"."default" NOT NULL,
  "job_group" varchar(64) COLLATE "pg_catalog"."default" NOT NULL,
  "version_num" int4 NOT NULL DEFAULT 0,
  "rec_token" varchar(10) COLLATE "pg_catalog"."default" NOT NULL,
  "invoke_target" varchar(500) COLLATE "pg_catalog"."default" NOT NULL,
  "cron_expression" varchar(255) COLLATE "pg_catalog"."default",
  "misfire_policy" varchar(20) COLLATE "pg_catalog"."default",
  "concurrent" char(1) COLLATE "pg_catalog"."default",
  "status" char(1) COLLATE "pg_catalog"."default",
  "create_by" varchar(64) COLLATE "pg_catalog"."default",
  "create_time" timestamp(6),
  "update_by" varchar(64) COLLATE "pg_catalog"."default",
  "update_time" timestamp(6),
  "remark" varchar(500) COLLATE "pg_catalog"."default",
  "parent_id" int8,
  "level" varchar(200) COLLATE "pg_catalog"."default"
)
;
COMMENT ON COLUMN "public"."tbl_sys_job"."job_id" IS '【任务ID】';
COMMENT ON COLUMN "public"."tbl_sys_job"."job_name" IS '【任务名称】';
COMMENT ON COLUMN "public"."tbl_sys_job"."job_group" IS '【任务组名】';
COMMENT ON COLUMN "public"."tbl_sys_job"."version_num" IS '【版本号】';
COMMENT ON COLUMN "public"."tbl_sys_job"."rec_token" IS '【随机码】';
COMMENT ON COLUMN "public"."tbl_sys_job"."invoke_target" IS '【调用目标字符串】';
COMMENT ON COLUMN "public"."tbl_sys_job"."cron_expression" IS '【cron执行表达式】';
COMMENT ON COLUMN "public"."tbl_sys_job"."misfire_policy" IS '【计划执行错误策略】1立即执行 2执行一次 3放弃执行';
COMMENT ON COLUMN "public"."tbl_sys_job"."concurrent" IS '【是否并发执行】0允许 1禁止';
COMMENT ON COLUMN "public"."tbl_sys_job"."status" IS '【状态】0正常 1暂停';
COMMENT ON COLUMN "public"."tbl_sys_job"."create_by" IS '【创建者】';
COMMENT ON COLUMN "public"."tbl_sys_job"."create_time" IS '【创建时间】';
COMMENT ON COLUMN "public"."tbl_sys_job"."update_by" IS '【更新者】';
COMMENT ON COLUMN "public"."tbl_sys_job"."update_time" IS '【更新时间】';
COMMENT ON COLUMN "public"."tbl_sys_job"."remark" IS '【备注信息】';
COMMENT ON COLUMN "public"."tbl_sys_job"."parent_id" IS '【父ID】';
COMMENT ON COLUMN "public"."tbl_sys_job"."level" IS '【层级】';
COMMENT ON TABLE "public"."tbl_sys_job" IS '【定时任务调度表】';

-- ----------------------------
-- Table structure for tbl_sys_job_log
-- ----------------------------
-- DROP TABLE IF EXISTS "public"."tbl_sys_job_log";
CREATE TABLE "public"."tbl_sys_job_log" (
  "job_log_id" int8 NOT NULL DEFAULT nextval('seq_sys_job_log'::regclass),
  "job_name" varchar(64) COLLATE "pg_catalog"."default" NOT NULL,
  "job_group" varchar(64) COLLATE "pg_catalog"."default" NOT NULL,
  "invoke_target" varchar(500) COLLATE "pg_catalog"."default" NOT NULL,
  "job_message" varchar(500) COLLATE "pg_catalog"."default",
  "status" char(1) COLLATE "pg_catalog"."default",
  "exception_info" varchar(2000) COLLATE "pg_catalog"."default",
  "create_time" timestamp(6)
)
;
COMMENT ON COLUMN "public"."tbl_sys_job_log"."job_log_id" IS '【任务日志ID】';
COMMENT ON COLUMN "public"."tbl_sys_job_log"."job_name" IS '【任务名称】';
COMMENT ON COLUMN "public"."tbl_sys_job_log"."job_group" IS '【任务组名】';
COMMENT ON COLUMN "public"."tbl_sys_job_log"."invoke_target" IS '【调用目标字符串】';
COMMENT ON COLUMN "public"."tbl_sys_job_log"."job_message" IS '【日志信息】';
COMMENT ON COLUMN "public"."tbl_sys_job_log"."status" IS '【执行状态】0正常 1失败';
COMMENT ON COLUMN "public"."tbl_sys_job_log"."exception_info" IS '【异常信息】';
COMMENT ON COLUMN "public"."tbl_sys_job_log"."create_time" IS '【创建时间】';
COMMENT ON TABLE "public"."tbl_sys_job_log" IS '【定时任务调度日志表】';

-- ----------------------------
-- Table structure for tbl_sys_logininfor
-- ----------------------------
-- DROP TABLE IF EXISTS "public"."tbl_sys_logininfor";
CREATE TABLE "public"."tbl_sys_logininfor" (
  "info_id" int8 NOT NULL DEFAULT nextval('seq_sys_logininfor'::regclass),
  "user_name" varchar(50) COLLATE "pg_catalog"."default",
  "ipaddr" varchar(128) COLLATE "pg_catalog"."default",
  "login_location" varchar(255) COLLATE "pg_catalog"."default",
  "browser" varchar(50) COLLATE "pg_catalog"."default",
  "os" varchar(50) COLLATE "pg_catalog"."default",
  "status" char(1) COLLATE "pg_catalog"."default",
  "msg" varchar(2000) COLLATE "pg_catalog"."default",
  "login_time" timestamp(6)
)
;
COMMENT ON COLUMN "public"."tbl_sys_logininfor"."info_id" IS '【访问ID】';
COMMENT ON COLUMN "public"."tbl_sys_logininfor"."user_name" IS '【用户账号】';
COMMENT ON COLUMN "public"."tbl_sys_logininfor"."ipaddr" IS '【登录IP地址】';
COMMENT ON COLUMN "public"."tbl_sys_logininfor"."login_location" IS '【登录地点】';
COMMENT ON COLUMN "public"."tbl_sys_logininfor"."browser" IS '【浏览器类型】';
COMMENT ON COLUMN "public"."tbl_sys_logininfor"."os" IS '【操作系统】';
COMMENT ON COLUMN "public"."tbl_sys_logininfor"."status" IS '【登录状态】0成功 1失败';
COMMENT ON COLUMN "public"."tbl_sys_logininfor"."msg" IS '【提示消息】';
COMMENT ON COLUMN "public"."tbl_sys_logininfor"."login_time" IS '【访问时间】';
COMMENT ON TABLE "public"."tbl_sys_logininfor" IS '【系统访问记录】';

-- ----------------------------
-- Table structure for tbl_sys_menu
-- ----------------------------
-- DROP TABLE IF EXISTS "public"."tbl_sys_menu";
CREATE TABLE "public"."tbl_sys_menu" (
  "menu_id" int8 NOT NULL DEFAULT nextval('seq_sys_menu'::regclass),
  "version_num" int4 NOT NULL DEFAULT 0,
  "rec_token" varchar(10) COLLATE "pg_catalog"."default" NOT NULL DEFAULT '1'::character varying,
  "menu_name" varchar(50) COLLATE "pg_catalog"."default" NOT NULL,
  "parent_id" int8 DEFAULT 0,
  "order_num" int4,
  "path" varchar(200) COLLATE "pg_catalog"."default",
  "component" varchar(255) COLLATE "pg_catalog"."default",
  "query_params" varchar(255) COLLATE "pg_catalog"."default",
  "is_frame" char(1) COLLATE "pg_catalog"."default",
  "is_cache" char(1) COLLATE "pg_catalog"."default",
  "url_path" varchar(255) COLLATE "pg_catalog"."default",
  "url_method" varchar(20) COLLATE "pg_catalog"."default",
  "url_opr_type" varchar(20) COLLATE "pg_catalog"."default",
  "url_check_flag" char(1) COLLATE "pg_catalog"."default",
  "menu_type" char(1) COLLATE "pg_catalog"."default",
  "visible" char(1) COLLATE "pg_catalog"."default",
  "status" char(1) COLLATE "pg_catalog"."default",
  "perms" varchar(100) COLLATE "pg_catalog"."default",
  "icon" varchar(100) COLLATE "pg_catalog"."default",
  "create_by" varchar(64) COLLATE "pg_catalog"."default",
  "create_time" timestamp(6),
  "update_by" varchar(64) COLLATE "pg_catalog"."default",
  "update_time" timestamp(6),
  "remark" varchar(500) COLLATE "pg_catalog"."default"
)
;
COMMENT ON COLUMN "public"."tbl_sys_menu"."menu_id" IS '【菜单ID】';
COMMENT ON COLUMN "public"."tbl_sys_menu"."version_num" IS '【版本号】';
COMMENT ON COLUMN "public"."tbl_sys_menu"."rec_token" IS '【随机码】';
COMMENT ON COLUMN "public"."tbl_sys_menu"."menu_name" IS '【菜单名称】';
COMMENT ON COLUMN "public"."tbl_sys_menu"."parent_id" IS '【父菜单ID】';
COMMENT ON COLUMN "public"."tbl_sys_menu"."order_num" IS '【显示顺序】';
COMMENT ON COLUMN "public"."tbl_sys_menu"."path" IS '【路由地址】';
COMMENT ON COLUMN "public"."tbl_sys_menu"."component" IS '【组件路径】';
COMMENT ON COLUMN "public"."tbl_sys_menu"."query_params" IS '【路由参数】';
COMMENT ON COLUMN "public"."tbl_sys_menu"."is_frame" IS '【是否为外链】0是 1否';
COMMENT ON COLUMN "public"."tbl_sys_menu"."is_cache" IS '【是否缓存】0缓存 1不缓存';
COMMENT ON COLUMN "public"."tbl_sys_menu"."url_path" IS '【url路径】';
COMMENT ON COLUMN "public"."tbl_sys_menu"."url_method" IS '【URL请求方式】由于restful风格同名，因此需要GET,POST等';
COMMENT ON COLUMN "public"."tbl_sys_menu"."url_opr_type" IS '【url操作类型】为了更便捷分配同类型资源，query：查询 ，add：新增，edit：编辑。。。';
COMMENT ON COLUMN "public"."tbl_sys_menu"."url_check_flag" IS '【url网关校验标志】为空或0则不校验；1校验；';
COMMENT ON COLUMN "public"."tbl_sys_menu"."menu_type" IS '【菜单类型】M目录 C菜单 F按钮';
COMMENT ON COLUMN "public"."tbl_sys_menu"."visible" IS '【菜单显示状态】0显示 1隐藏';
COMMENT ON COLUMN "public"."tbl_sys_menu"."status" IS '【菜单状态】0正常 1停用';
COMMENT ON COLUMN "public"."tbl_sys_menu"."perms" IS '【权限标识】';
COMMENT ON COLUMN "public"."tbl_sys_menu"."icon" IS '【菜单图标】';
COMMENT ON COLUMN "public"."tbl_sys_menu"."create_by" IS '【创建者】';
COMMENT ON COLUMN "public"."tbl_sys_menu"."create_time" IS '【创建时间】';
COMMENT ON COLUMN "public"."tbl_sys_menu"."update_by" IS '【更新者】';
COMMENT ON COLUMN "public"."tbl_sys_menu"."update_time" IS '【更新时间】';
COMMENT ON COLUMN "public"."tbl_sys_menu"."remark" IS '【备注】';
COMMENT ON TABLE "public"."tbl_sys_menu" IS '【菜单权限表】';

-- ----------------------------
-- Table structure for tbl_sys_notice
-- ----------------------------
-- DROP TABLE IF EXISTS "public"."tbl_sys_notice";
CREATE TABLE "public"."tbl_sys_notice" (
  "notice_id" int4 NOT NULL DEFAULT nextval('seq_sys_notice'::regclass),
  "version_num" int4 NOT NULL DEFAULT 0,
  "rec_token" varchar(10) COLLATE "pg_catalog"."default" NOT NULL DEFAULT '1'::character varying,
  "notice_title" varchar(50) COLLATE "pg_catalog"."default" NOT NULL,
  "notice_type" char(1) COLLATE "pg_catalog"."default" NOT NULL,
  "notice_content" text COLLATE "pg_catalog"."default",
  "status" char(1) COLLATE "pg_catalog"."default",
  "create_by" varchar(64) COLLATE "pg_catalog"."default",
  "create_time" timestamp(6),
  "update_by" varchar(64) COLLATE "pg_catalog"."default",
  "update_time" timestamp(6),
  "remark" varchar(255) COLLATE "pg_catalog"."default"
)
;
COMMENT ON COLUMN "public"."tbl_sys_notice"."notice_id" IS '【公告ID】';
COMMENT ON COLUMN "public"."tbl_sys_notice"."version_num" IS '【版本号】';
COMMENT ON COLUMN "public"."tbl_sys_notice"."rec_token" IS '【随机码】';
COMMENT ON COLUMN "public"."tbl_sys_notice"."notice_title" IS '【公告标题】';
COMMENT ON COLUMN "public"."tbl_sys_notice"."notice_type" IS '【公告类型】1通知 2公告';
COMMENT ON COLUMN "public"."tbl_sys_notice"."notice_content" IS '【公告内容】';
COMMENT ON COLUMN "public"."tbl_sys_notice"."status" IS '【公告状态】0正常 1关闭';
COMMENT ON COLUMN "public"."tbl_sys_notice"."create_by" IS '【创建者】';
COMMENT ON COLUMN "public"."tbl_sys_notice"."create_time" IS '【创建时间】';
COMMENT ON COLUMN "public"."tbl_sys_notice"."update_by" IS '【更新者】';
COMMENT ON COLUMN "public"."tbl_sys_notice"."update_time" IS '【更新时间】';
COMMENT ON COLUMN "public"."tbl_sys_notice"."remark" IS '【备注】';
COMMENT ON TABLE "public"."tbl_sys_notice" IS '【通知公告表】';

-- ----------------------------
-- Table structure for tbl_sys_oper_log
-- ----------------------------
-- DROP TABLE IF EXISTS "public"."tbl_sys_oper_log";
CREATE TABLE "public"."tbl_sys_oper_log" (
  "oper_id" int8 NOT NULL DEFAULT nextval('seq_sys_oper_log'::regclass),
  "title" varchar(50) COLLATE "pg_catalog"."default" NOT NULL,
  "business_type" int4,
  "method" varchar(100) COLLATE "pg_catalog"."default",
  "request_method" varchar(10) COLLATE "pg_catalog"."default",
  "operator_type" int4,
  "oper_name" varchar(50) COLLATE "pg_catalog"."default",
  "dept_name" varchar(50) COLLATE "pg_catalog"."default",
  "oper_url" varchar(255) COLLATE "pg_catalog"."default",
  "oper_ip" varchar(128) COLLATE "pg_catalog"."default",
  "oper_location" varchar(255) COLLATE "pg_catalog"."default",
  "oper_param" varchar(2000) COLLATE "pg_catalog"."default",
  "json_result" varchar(2000) COLLATE "pg_catalog"."default",
  "status" int4,
  "error_msg" varchar(2000) COLLATE "pg_catalog"."default",
  "oper_time" timestamp(6)
)
;
COMMENT ON COLUMN "public"."tbl_sys_oper_log"."oper_id" IS '【日志主键】';
COMMENT ON COLUMN "public"."tbl_sys_oper_log"."title" IS '【模块标题】';
COMMENT ON COLUMN "public"."tbl_sys_oper_log"."business_type" IS '【业务类型】0其它 1新增 2修改 3删除';
COMMENT ON COLUMN "public"."tbl_sys_oper_log"."method" IS '【方法名称】';
COMMENT ON COLUMN "public"."tbl_sys_oper_log"."request_method" IS '【请求方式】';
COMMENT ON COLUMN "public"."tbl_sys_oper_log"."operator_type" IS '【操作类别】0其它 1后台用户 2手机端用户';
COMMENT ON COLUMN "public"."tbl_sys_oper_log"."oper_name" IS '【操作人员】';
COMMENT ON COLUMN "public"."tbl_sys_oper_log"."dept_name" IS '【部门名称】';
COMMENT ON COLUMN "public"."tbl_sys_oper_log"."oper_url" IS '【请求URL】';
COMMENT ON COLUMN "public"."tbl_sys_oper_log"."oper_ip" IS '【主机地址】';
COMMENT ON COLUMN "public"."tbl_sys_oper_log"."oper_location" IS '【操作地点】';
COMMENT ON COLUMN "public"."tbl_sys_oper_log"."oper_param" IS '【请求参数】';
COMMENT ON COLUMN "public"."tbl_sys_oper_log"."json_result" IS '【返回参数】';
COMMENT ON COLUMN "public"."tbl_sys_oper_log"."status" IS '【操作状态】0正常 1异常';
COMMENT ON COLUMN "public"."tbl_sys_oper_log"."error_msg" IS '【错误消息】';
COMMENT ON COLUMN "public"."tbl_sys_oper_log"."oper_time" IS '【操作时间】';
COMMENT ON TABLE "public"."tbl_sys_oper_log" IS '【操作日志记录】';

-- ----------------------------
-- Table structure for tbl_sys_post
-- ----------------------------
-- DROP TABLE IF EXISTS "public"."tbl_sys_post";
CREATE TABLE "public"."tbl_sys_post" (
  "post_id" int8 NOT NULL DEFAULT nextval('seq_sys_post'::regclass),
  "version_num" int4 NOT NULL DEFAULT 0,
  "rec_token" varchar(10) COLLATE "pg_catalog"."default" NOT NULL DEFAULT '1'::character varying,
  "post_code" varchar(64) COLLATE "pg_catalog"."default" NOT NULL,
  "post_name" varchar(50) COLLATE "pg_catalog"."default" NOT NULL,
  "post_sort" int4 NOT NULL,
  "status" char(1) COLLATE "pg_catalog"."default" NOT NULL,
  "create_by" varchar(64) COLLATE "pg_catalog"."default",
  "create_time" timestamp(6),
  "update_by" varchar(64) COLLATE "pg_catalog"."default",
  "update_time" timestamp(6),
  "remark" varchar(500) COLLATE "pg_catalog"."default"
)
;
COMMENT ON COLUMN "public"."tbl_sys_post"."post_id" IS '【岗位ID】';
COMMENT ON COLUMN "public"."tbl_sys_post"."version_num" IS '【版本号】';
COMMENT ON COLUMN "public"."tbl_sys_post"."rec_token" IS '【随机码】';
COMMENT ON COLUMN "public"."tbl_sys_post"."post_code" IS '【岗位编码】';
COMMENT ON COLUMN "public"."tbl_sys_post"."post_name" IS '【岗位名称】';
COMMENT ON COLUMN "public"."tbl_sys_post"."post_sort" IS '【显示顺序】';
COMMENT ON COLUMN "public"."tbl_sys_post"."status" IS '【状态】0正常 1停用';
COMMENT ON COLUMN "public"."tbl_sys_post"."create_by" IS '【创建者】';
COMMENT ON COLUMN "public"."tbl_sys_post"."create_time" IS '【创建时间】';
COMMENT ON COLUMN "public"."tbl_sys_post"."update_by" IS '【更新者】';
COMMENT ON COLUMN "public"."tbl_sys_post"."update_time" IS '【更新时间】';
COMMENT ON COLUMN "public"."tbl_sys_post"."remark" IS '【备注】';
COMMENT ON TABLE "public"."tbl_sys_post" IS '【岗位信息表】';

-- ----------------------------
-- Table structure for tbl_sys_role
-- ----------------------------
-- DROP TABLE IF EXISTS "public"."tbl_sys_role";
CREATE TABLE "public"."tbl_sys_role" (
  "role_id" int8 NOT NULL DEFAULT nextval('seq_sys_role'::regclass),
  "version_num" int4 NOT NULL DEFAULT 0,
  "rec_token" varchar(10) COLLATE "pg_catalog"."default" NOT NULL DEFAULT '1'::character varying,
  "role_name" varchar(30) COLLATE "pg_catalog"."default" NOT NULL,
  "role_key" varchar(100) COLLATE "pg_catalog"."default" NOT NULL,
  "role_sort" int4 NOT NULL,
  "data_scope" varchar(1) COLLATE "pg_catalog"."default",
  "menu_check_strictly" varchar(1) COLLATE "pg_catalog"."default",
  "dept_check_strictly" varchar(1) COLLATE "pg_catalog"."default",
  "status" varchar(1) COLLATE "pg_catalog"."default" NOT NULL,
  "del_flag" varchar(1) COLLATE "pg_catalog"."default",
  "create_by" varchar(64) COLLATE "pg_catalog"."default",
  "create_time" timestamp(6),
  "update_by" varchar(64) COLLATE "pg_catalog"."default",
  "update_time" timestamp(6),
  "remark" varchar(500) COLLATE "pg_catalog"."default"
)
;
COMMENT ON COLUMN "public"."tbl_sys_role"."role_id" IS '【角色ID】';
COMMENT ON COLUMN "public"."tbl_sys_role"."version_num" IS '【版本号】';
COMMENT ON COLUMN "public"."tbl_sys_role"."rec_token" IS '【随机码】';
COMMENT ON COLUMN "public"."tbl_sys_role"."role_name" IS '【角色名称】';
COMMENT ON COLUMN "public"."tbl_sys_role"."role_key" IS '【角色权限字符串】';
COMMENT ON COLUMN "public"."tbl_sys_role"."role_sort" IS '【显示顺序】';
COMMENT ON COLUMN "public"."tbl_sys_role"."data_scope" IS '【数据范围】1：全部数据权限 2：自定数据权限 3：本部门数据权限 4：本部门及以下数据权限';
COMMENT ON COLUMN "public"."tbl_sys_role"."menu_check_strictly" IS '【菜单树选择项是否关联显示】';
COMMENT ON COLUMN "public"."tbl_sys_role"."dept_check_strictly" IS '【部门树选择项是否关联显示】';
COMMENT ON COLUMN "public"."tbl_sys_role"."status" IS '【角色状态】0正常 1停用';
COMMENT ON COLUMN "public"."tbl_sys_role"."del_flag" IS '【删除标志】0代表存在 2代表删除';
COMMENT ON COLUMN "public"."tbl_sys_role"."create_by" IS '【创建者】';
COMMENT ON COLUMN "public"."tbl_sys_role"."create_time" IS '【创建时间】';
COMMENT ON COLUMN "public"."tbl_sys_role"."update_by" IS '【更新者】';
COMMENT ON COLUMN "public"."tbl_sys_role"."update_time" IS '【更新时间】';
COMMENT ON COLUMN "public"."tbl_sys_role"."remark" IS '【备注】';
COMMENT ON TABLE "public"."tbl_sys_role" IS '【角色信息表】';

-- ----------------------------
-- Table structure for tbl_sys_role_dept
-- ----------------------------
-- DROP TABLE IF EXISTS "public"."tbl_sys_role_dept";
CREATE TABLE "public"."tbl_sys_role_dept" (
  "role_id" int8 NOT NULL,
  "dept_id" int8 NOT NULL
)
;
COMMENT ON COLUMN "public"."tbl_sys_role_dept"."role_id" IS '【角色ID】';
COMMENT ON COLUMN "public"."tbl_sys_role_dept"."dept_id" IS '【部门ID】';
COMMENT ON TABLE "public"."tbl_sys_role_dept" IS '【角色和部门关联表】';

-- ----------------------------
-- Table structure for tbl_sys_role_menu
-- ----------------------------
-- DROP TABLE IF EXISTS "public"."tbl_sys_role_menu";
CREATE TABLE "public"."tbl_sys_role_menu" (
  "role_id" int8 NOT NULL,
  "menu_id" int8 NOT NULL
)
;
COMMENT ON COLUMN "public"."tbl_sys_role_menu"."role_id" IS '【角色ID】';
COMMENT ON COLUMN "public"."tbl_sys_role_menu"."menu_id" IS '【菜单ID】';
COMMENT ON TABLE "public"."tbl_sys_role_menu" IS '【角色和菜单关联表】';

-- ----------------------------
-- Table structure for tbl_sys_user
-- ----------------------------
-- DROP TABLE IF EXISTS "public"."tbl_sys_user";
CREATE TABLE "public"."tbl_sys_user" (
  "user_id" int8 NOT NULL DEFAULT nextval('seq_sys_user'::regclass),
  "version_num" int4 NOT NULL DEFAULT 0,
  "rec_token" varchar(10) COLLATE "pg_catalog"."default" NOT NULL DEFAULT '1'::character varying,
  "dept_id" int8,
  "user_name" varchar(30) COLLATE "pg_catalog"."default" NOT NULL,
  "nick_name" varchar(30) COLLATE "pg_catalog"."default" NOT NULL,
  "user_type" varchar(2) COLLATE "pg_catalog"."default",
  "email" varchar(50) COLLATE "pg_catalog"."default",
  "phonenumber" varchar(11) COLLATE "pg_catalog"."default",
  "sex" char(1) COLLATE "pg_catalog"."default",
  "avatar" varchar(100) COLLATE "pg_catalog"."default",
  "password" varchar(100) COLLATE "pg_catalog"."default",
  "status" char(1) COLLATE "pg_catalog"."default",
  "del_flag" char(1) COLLATE "pg_catalog"."default" DEFAULT '0'::bpchar,
  "login_ip" varchar(128) COLLATE "pg_catalog"."default",
  "login_date" timestamp(6),
  "is_locked" char(1) COLLATE "pg_catalog"."default",
  "login_error_count" int4,
  "last_login_error_time" timestamp(6),
  "create_by" varchar(64) COLLATE "pg_catalog"."default",
  "create_time" timestamp(6),
  "update_by" varchar(64) COLLATE "pg_catalog"."default",
  "update_time" timestamp(6),
  "remark" varchar(500) COLLATE "pg_catalog"."default"
)
;
COMMENT ON COLUMN "public"."tbl_sys_user"."user_id" IS '【用户ID】';
COMMENT ON COLUMN "public"."tbl_sys_user"."version_num" IS '【版本号】';
COMMENT ON COLUMN "public"."tbl_sys_user"."rec_token" IS '【随机码】';
COMMENT ON COLUMN "public"."tbl_sys_user"."dept_id" IS '【部门ID】';
COMMENT ON COLUMN "public"."tbl_sys_user"."user_name" IS '【用户账号】';
COMMENT ON COLUMN "public"."tbl_sys_user"."nick_name" IS '【用户昵称】';
COMMENT ON COLUMN "public"."tbl_sys_user"."user_type" IS '【用户类型】00系统用户';
COMMENT ON COLUMN "public"."tbl_sys_user"."email" IS '【用户邮箱】';
COMMENT ON COLUMN "public"."tbl_sys_user"."phonenumber" IS '【手机号码】';
COMMENT ON COLUMN "public"."tbl_sys_user"."sex" IS '【用户性别】0男 1女 2未知';
COMMENT ON COLUMN "public"."tbl_sys_user"."avatar" IS '【头像地址】';
COMMENT ON COLUMN "public"."tbl_sys_user"."password" IS '【密码】';
COMMENT ON COLUMN "public"."tbl_sys_user"."status" IS '【帐号状态】0正常 1停用';
COMMENT ON COLUMN "public"."tbl_sys_user"."del_flag" IS '【删除标志】0代表存在 2代表删除';
COMMENT ON COLUMN "public"."tbl_sys_user"."login_ip" IS '【最后登录IP】';
COMMENT ON COLUMN "public"."tbl_sys_user"."login_date" IS '【最后登录时间】';
COMMENT ON COLUMN "public"."tbl_sys_user"."is_locked" IS '【锁定状态】';
COMMENT ON COLUMN "public"."tbl_sys_user"."login_error_count" IS '【登陆错误次数】';
COMMENT ON COLUMN "public"."tbl_sys_user"."last_login_error_time" IS '【登陆错误时间】';
COMMENT ON COLUMN "public"."tbl_sys_user"."create_by" IS '【创建者】';
COMMENT ON COLUMN "public"."tbl_sys_user"."create_time" IS '【创建时间】';
COMMENT ON COLUMN "public"."tbl_sys_user"."update_by" IS '【更新者】';
COMMENT ON COLUMN "public"."tbl_sys_user"."update_time" IS '【更新时间】';
COMMENT ON COLUMN "public"."tbl_sys_user"."remark" IS '【备注】';
COMMENT ON TABLE "public"."tbl_sys_user" IS '【用户信息表】';

-- ----------------------------
-- Table structure for tbl_sys_user_post
-- ----------------------------
-- DROP TABLE IF EXISTS "public"."tbl_sys_user_post";
CREATE TABLE "public"."tbl_sys_user_post" (
  "user_id" int8 NOT NULL,
  "post_id" int8 NOT NULL
)
;
COMMENT ON COLUMN "public"."tbl_sys_user_post"."user_id" IS '【用户ID】';
COMMENT ON COLUMN "public"."tbl_sys_user_post"."post_id" IS '【岗位ID】';
COMMENT ON TABLE "public"."tbl_sys_user_post" IS '【用户与岗位关联表】';

-- ----------------------------
-- Table structure for tbl_sys_user_role
-- ----------------------------
-- DROP TABLE IF EXISTS "public"."tbl_sys_user_role";
CREATE TABLE "public"."tbl_sys_user_role" (
  "user_id" int8 NOT NULL,
  "role_id" int8 NOT NULL
)
;
COMMENT ON COLUMN "public"."tbl_sys_user_role"."user_id" IS '【用户ID】';
COMMENT ON COLUMN "public"."tbl_sys_user_role"."role_id" IS '【角色ID】';
COMMENT ON TABLE "public"."tbl_sys_user_role" IS '【用户和角色关联表】';

-- ----------------------------
-- Table structure for tbl_sys_warning_contact
-- ----------------------------
-- DROP TABLE IF EXISTS "public"."tbl_sys_warning_contact";
CREATE TABLE "public"."tbl_sys_warning_contact" (
  "id" int8 NOT NULL DEFAULT nextval('seq_sys_warning_contact'::regclass),
  "version_num" int4 NOT NULL DEFAULT 0,
  "rec_token" varchar(10) COLLATE "pg_catalog"."default" NOT NULL DEFAULT '1'::character varying,
  "warning_type" varchar(32) COLLATE "pg_catalog"."default" NOT NULL,
  "contact_type" varchar(32) COLLATE "pg_catalog"."default" NOT NULL,
  "contact" varchar(32) COLLATE "pg_catalog"."default" NOT NULL,
  "status" varchar(32) COLLATE "pg_catalog"."default" NOT NULL DEFAULT '00'::character varying,
  "create_by" varchar(32) COLLATE "pg_catalog"."default",
  "create_time" timestamp(6),
  "update_by" varchar(32) COLLATE "pg_catalog"."default",
  "update_time" timestamp(6)
)
;
COMMENT ON COLUMN "public"."tbl_sys_warning_contact"."id" IS '【主键id】';
COMMENT ON COLUMN "public"."tbl_sys_warning_contact"."version_num" IS '【版本号】';
COMMENT ON COLUMN "public"."tbl_sys_warning_contact"."rec_token" IS '【随机码】';
COMMENT ON COLUMN "public"."tbl_sys_warning_contact"."warning_type" IS '【告警场景】';
COMMENT ON COLUMN "public"."tbl_sys_warning_contact"."contact_type" IS '【类型】手机号:01 邮箱:02';
COMMENT ON COLUMN "public"."tbl_sys_warning_contact"."contact" IS '【联系方式】';
COMMENT ON COLUMN "public"."tbl_sys_warning_contact"."status" IS '【状态】正常:00 停用:01 删除:03';
COMMENT ON COLUMN "public"."tbl_sys_warning_contact"."create_by" IS '【创建人】';
COMMENT ON COLUMN "public"."tbl_sys_warning_contact"."create_time" IS '【创建时间】';
COMMENT ON COLUMN "public"."tbl_sys_warning_contact"."update_by" IS '【更新人】';
COMMENT ON COLUMN "public"."tbl_sys_warning_contact"."update_time" IS '【更新时间】';
COMMENT ON TABLE "public"."tbl_sys_warning_contact" IS '【告警联系方式表】';

-- ----------------------------
-- Alter sequences owned by
-- ----------------------------
SELECT setval('"public"."seq_sys_config"', 4, true);

-- ----------------------------
-- Alter sequences owned by
-- ----------------------------
SELECT setval('"public"."seq_sys_dept"', 8, true);

-- ----------------------------
-- Alter sequences owned by
-- ----------------------------
SELECT setval('"public"."seq_sys_dict_data"', 54, true);

-- ----------------------------
-- Alter sequences owned by
-- ----------------------------
SELECT setval('"public"."seq_sys_dict_type"', 28, true);

-- ----------------------------
-- Alter sequences owned by
-- ----------------------------
SELECT setval('"public"."seq_sys_job"', 1, false);

-- ----------------------------
-- Alter sequences owned by
-- ----------------------------
SELECT setval('"public"."seq_sys_job_log"', 1, false);

-- ----------------------------
-- Alter sequences owned by
-- ----------------------------
SELECT setval('"public"."seq_sys_logininfor"', 976, true);

-- ----------------------------
-- Alter sequences owned by
-- ----------------------------
SELECT setval('"public"."seq_sys_menu"', 3125, true);

-- ----------------------------
-- Alter sequences owned by
-- ----------------------------
SELECT setval('"public"."seq_sys_notice"', 7, true);

-- ----------------------------
-- Alter sequences owned by
-- ----------------------------
SELECT setval('"public"."seq_sys_oper_log"', 560, true);

-- ----------------------------
-- Alter sequences owned by
-- ----------------------------
SELECT setval('"public"."seq_sys_post"', 1, false);

-- ----------------------------
-- Alter sequences owned by
-- ----------------------------
SELECT setval('"public"."seq_sys_role"', 3, false);

-- ----------------------------
-- Alter sequences owned by
-- ----------------------------
SELECT setval('"public"."seq_sys_user"', 100004, true);

-- ----------------------------
-- Alter sequences owned by
-- ----------------------------
SELECT setval('"public"."seq_sys_warning_contact"', 9, true);

-- ----------------------------
-- Alter sequences owned by
-- ----------------------------
SELECT setval('"public"."seq_sys_warning_log"', 1, false);

-- ----------------------------
-- Alter sequences owned by
-- ----------------------------
ALTER SEQUENCE "public"."tbl_data_table_index_id_seq"
OWNED BY "public"."tbl_data_table_index"."id";
SELECT setval('"public"."tbl_data_table_index_id_seq"', 1, false);

-- ----------------------------
-- Primary Key structure for table tbl_data_table
-- ----------------------------
ALTER TABLE "public"."tbl_data_table" ADD CONSTRAINT "tbl_data_table_pkey" PRIMARY KEY ("table_id");

-- ----------------------------
-- Primary Key structure for table tbl_data_table_index
-- ----------------------------
ALTER TABLE "public"."tbl_data_table_index" ADD CONSTRAINT "tbl_data_table_index_pkey" PRIMARY KEY ("id");

-- ----------------------------
-- Primary Key structure for table tbl_sys_config
-- ----------------------------
ALTER TABLE "public"."tbl_sys_config" ADD CONSTRAINT "pk_tbl_sys_config" PRIMARY KEY ("config_id");

-- ----------------------------
-- Primary Key structure for table tbl_sys_dept
-- ----------------------------
ALTER TABLE "public"."tbl_sys_dept" ADD CONSTRAINT "pk_tbl_sys_dept" PRIMARY KEY ("dept_id");

-- ----------------------------
-- Primary Key structure for table tbl_sys_dict_data
-- ----------------------------
ALTER TABLE "public"."tbl_sys_dict_data" ADD CONSTRAINT "[REDACTED] PRIMARY KEY ("dict_code");

-- ----------------------------
-- Primary Key structure for table tbl_sys_dict_type
-- ----------------------------
ALTER TABLE "public"."tbl_sys_dict_type" ADD CONSTRAINT "[REDACTED] PRIMARY KEY ("dict_id");

-- ----------------------------
-- Primary Key structure for table tbl_sys_job
-- ----------------------------
ALTER TABLE "public"."tbl_sys_job" ADD CONSTRAINT "pk_tbl_sys_job" PRIMARY KEY ("job_id", "job_name", "job_group");

-- ----------------------------
-- Primary Key structure for table tbl_sys_job_log
-- ----------------------------
ALTER TABLE "public"."tbl_sys_job_log" ADD CONSTRAINT "pk_tbl_sys_job_log" PRIMARY KEY ("job_log_id");

-- ----------------------------
-- Primary Key structure for table tbl_sys_logininfor
-- ----------------------------
ALTER TABLE "public"."tbl_sys_logininfor" ADD CONSTRAINT "[REDACTED] PRIMARY KEY ("info_id");

-- ----------------------------
-- Primary Key structure for table tbl_sys_menu
-- ----------------------------
ALTER TABLE "public"."tbl_sys_menu" ADD CONSTRAINT "pk_tbl_sys_menu" PRIMARY KEY ("menu_id");

-- ----------------------------
-- Primary Key structure for table tbl_sys_notice
-- ----------------------------
ALTER TABLE "public"."tbl_sys_notice" ADD CONSTRAINT "pk_tbl_sys_notice" PRIMARY KEY ("notice_id");

-- ----------------------------
-- Primary Key structure for table tbl_sys_oper_log
-- ----------------------------
ALTER TABLE "public"."tbl_sys_oper_log" ADD CONSTRAINT "[REDACTED] PRIMARY KEY ("oper_id");

-- ----------------------------
-- Primary Key structure for table tbl_sys_post
-- ----------------------------
ALTER TABLE "public"."tbl_sys_post" ADD CONSTRAINT "pk_tbl_sys_post" PRIMARY KEY ("post_id");

-- ----------------------------
-- Primary Key structure for table tbl_sys_role
-- ----------------------------
ALTER TABLE "public"."tbl_sys_role" ADD CONSTRAINT "pk_tbl_sys_role" PRIMARY KEY ("role_id");

-- ----------------------------
-- Primary Key structure for table tbl_sys_role_dept
-- ----------------------------
ALTER TABLE "public"."tbl_sys_role_dept" ADD CONSTRAINT "[REDACTED] PRIMARY KEY ("role_id", "dept_id");

-- ----------------------------
-- Primary Key structure for table tbl_sys_role_menu
-- ----------------------------
ALTER TABLE "public"."tbl_sys_role_menu" ADD CONSTRAINT "[REDACTED] PRIMARY KEY ("role_id", "menu_id");

-- ----------------------------
-- Primary Key structure for table tbl_sys_user
-- ----------------------------
ALTER TABLE "public"."tbl_sys_user" ADD CONSTRAINT "pk_tbl_sys_user" PRIMARY KEY ("user_id");

-- ----------------------------
-- Primary Key structure for table tbl_sys_user_post
-- ----------------------------
ALTER TABLE "public"."tbl_sys_user_post" ADD CONSTRAINT "[REDACTED] PRIMARY KEY ("user_id", "post_id");

-- ----------------------------
-- Primary Key structure for table tbl_sys_user_role
-- ----------------------------
ALTER TABLE "public"."tbl_sys_user_role" ADD CONSTRAINT "[REDACTED] PRIMARY KEY ("user_id", "role_id");

-- ----------------------------
-- Primary Key structure for table tbl_sys_warning_contact
-- ----------------------------
ALTER TABLE "public"."tbl_sys_warning_contact" ADD CONSTRAINT "[REDACTED] PRIMARY KEY ("id");
