drop database if exists nacos_config;
create database nacos_config;
use nacos_config;

CREATE TABLE `config_info`
(
    `id`                 bigint(20) NOT NULL AUTO_INCREMENT COMMENT 'id',
    `data_id`            varchar(255) NOT NULL COMMENT 'data_id',
    `group_id`           varchar(255)          DEFAULT NULL,
    `content`            longtext     NOT NULL COMMENT 'content',
    `md5`                varchar(32)           DEFAULT NULL COMMENT 'md5',
    `gmt_create`         datetime     NOT NULL DEFAULT CURRENT_TIMESTAMP COMMENT '创建时间',
    `gmt_modified`       datetime     NOT NULL DEFAULT CURRENT_TIMESTAMP COMMENT '修改时间',
    `src_user`           text COMMENT 'source user',
    `src_ip`             varchar(50)           DEFAULT NULL COMMENT 'source ip',
    `app_name`           varchar(128)          DEFAULT NULL,
    `tenant_id`          varchar(128)          DEFAULT '' COMMENT '租户字段',
    `c_desc`             varchar(256)          DEFAULT NULL,
    `c_use`              varchar(64)           DEFAULT NULL,
    `effect`             varchar(64)           DEFAULT NULL,
    `type`               varchar(64)           DEFAULT NULL,
    `encrypted_data_key` varchar(255)          DEFAULT NULL,
    `c_schema`           text,
    PRIMARY KEY (`id`),
    UNIQUE KEY `uk_configinfo_datagrouptenant` (`data_id`,`group_id`,`tenant_id`)
) ENGINE=InnoDB DEFAULT CHARSET=utf8 COLLATE=utf8_bin COMMENT='config_info';

CREATE TABLE `config_info_aggr`
(
    `id`           bigint(20) NOT NULL AUTO_INCREMENT COMMENT 'id',
    `data_id`      varchar(255) NOT NULL COMMENT 'data_id',
    `group_id`     varchar(255) NOT NULL COMMENT 'group_id',
    `datum_id`     varchar(255) NOT NULL COMMENT 'datum_id',
    `content`      longtext     NOT NULL COMMENT '内容',
    `gmt_modified` datetime     NOT NULL COMMENT '修改时间',
    `app_name`     varchar(128) DEFAULT NULL,
    `tenant_id`    varchar(128) DEFAULT '' COMMENT '租户字段',
    PRIMARY KEY (`id`),
    UNIQUE KEY `uk_configinfoaggr_datagrouptenantdatum` (`data_id`,`group_id`,`tenant_id`,`datum_id`)
) ENGINE=InnoDB DEFAULT CHARSET=utf8 COLLATE=utf8_bin COMMENT='增加租户字段';



CREATE TABLE `config_info_beta`
(
    `id`           bigint(20) NOT NULL AUTO_INCREMENT COMMENT 'id',
    `data_id`      varchar(255) NOT NULL COMMENT 'data_id',
    `group_id`     varchar(128) NOT NULL COMMENT 'group_id',
    `app_name`     varchar(128)          DEFAULT NULL COMMENT 'app_name',
    `content`      longtext     NOT NULL COMMENT 'content',
    `beta_ips`     varchar(1024)         DEFAULT NULL COMMENT 'betaIps',
    `md5`          varchar(32)           DEFAULT NULL COMMENT 'md5',
    `gmt_create`   datetime     NOT NULL DEFAULT CURRENT_TIMESTAMP COMMENT '创建时间',
    `gmt_modified` datetime     NOT NULL DEFAULT CURRENT_TIMESTAMP COMMENT '修改时间',
    `src_user`     text COMMENT 'source user',
    `src_ip`       varchar(50)           DEFAULT NULL COMMENT 'source ip',
    `tenant_id`    varchar(128)          DEFAULT '' COMMENT '租户字段',
    PRIMARY KEY (`id`),
    UNIQUE KEY `uk_configinfobeta_datagrouptenant` (`data_id`,`group_id`,`tenant_id`)
) ENGINE=InnoDB DEFAULT CHARSET=utf8 COLLATE=utf8_bin COMMENT='config_info_beta';


CREATE TABLE `config_info_tag`
(
    `id`           bigint(20) NOT NULL AUTO_INCREMENT COMMENT 'id',
    `data_id`      varchar(255) NOT NULL COMMENT 'data_id',
    `group_id`     varchar(128) NOT NULL COMMENT 'group_id',
    `tenant_id`    varchar(128)          DEFAULT '' COMMENT 'tenant_id',
    `tag_id`       varchar(128) NOT NULL COMMENT 'tag_id',
    `app_name`     varchar(128)          DEFAULT NULL COMMENT 'app_name',
    `content`      longtext     NOT NULL COMMENT 'content',
    `md5`          varchar(32)           DEFAULT NULL COMMENT 'md5',
    `gmt_create`   datetime     NOT NULL DEFAULT CURRENT_TIMESTAMP COMMENT '创建时间',
    `gmt_modified` datetime     NOT NULL DEFAULT CURRENT_TIMESTAMP COMMENT '修改时间',
    `src_user`     text COMMENT 'source user',
    `src_ip`       varchar(50)           DEFAULT NULL COMMENT 'source ip',
    PRIMARY KEY (`id`),
    UNIQUE KEY `uk_configinfotag_datagrouptenanttag` (`data_id`,`group_id`,`tenant_id`,`tag_id`)
) ENGINE=InnoDB DEFAULT CHARSET=utf8 COLLATE=utf8_bin COMMENT='config_info_tag';


CREATE TABLE `config_tags_relation`
(
    `id`        bigint(20) NOT NULL COMMENT 'id',
    `tag_name`  varchar(128) NOT NULL COMMENT 'tag_name',
    `tag_type`  varchar(64)  DEFAULT NULL COMMENT 'tag_type',
    `data_id`   varchar(255) NOT NULL COMMENT 'data_id',
    `group_id`  varchar(128) NOT NULL COMMENT 'group_id',
    `tenant_id` varchar(128) DEFAULT '' COMMENT 'tenant_id',
    `nid`       bigint(20) NOT NULL AUTO_INCREMENT,
    PRIMARY KEY (`nid`),
    UNIQUE KEY `uk_configtagrelation_configidtag` (`id`,`tag_name`,`tag_type`),
    KEY         `idx_tenant_id` (`tenant_id`)
) ENGINE=InnoDB DEFAULT CHARSET=utf8 COLLATE=utf8_bin COMMENT='config_tag_relation';


CREATE TABLE `group_capacity`
(
    `id`                bigint(20) unsigned NOT NULL AUTO_INCREMENT COMMENT '主键ID',
    `group_id`          varchar(128) NOT NULL DEFAULT '' COMMENT 'Group ID，空字符表示整个集群',
    `quota`             int(10) unsigned NOT NULL DEFAULT '0' COMMENT '配额，0表示使用默认值',
    `usage`             int(10) unsigned NOT NULL DEFAULT '0' COMMENT '使用量',
    `max_size`          int(10) unsigned NOT NULL DEFAULT '0' COMMENT '单个配置大小上限，单位为字节，0表示使用默认值',
    `max_aggr_count`    int(10) unsigned NOT NULL DEFAULT '0' COMMENT '聚合子配置最大个数，，0表示使用默认值',
    `max_aggr_size`     int(10) unsigned NOT NULL DEFAULT '0' COMMENT '单个聚合数据的子配置大小上限，单位为字节，0表示使用默认值',
    `max_history_count` int(10) unsigned NOT NULL DEFAULT '0' COMMENT '最大变更历史数量',
    `gmt_create`        datetime     NOT NULL DEFAULT CURRENT_TIMESTAMP COMMENT '创建时间',
    `gmt_modified`      datetime     NOT NULL DEFAULT CURRENT_TIMESTAMP COMMENT '修改时间',
    PRIMARY KEY (`id`),
    UNIQUE KEY `uk_group_id` (`group_id`)
) ENGINE=InnoDB DEFAULT CHARSET=utf8 COLLATE=utf8_bin COMMENT='集群、各Group容量信息表';


CREATE TABLE `his_config_info`
(
    `id`                 bigint(64) unsigned NOT NULL,
    `nid`                bigint(20) unsigned NOT NULL AUTO_INCREMENT,
    `data_id`            varchar(255) NOT NULL,
    `group_id`           varchar(128) NOT NULL,
    `app_name`           varchar(128)          DEFAULT NULL COMMENT 'app_name',
    `content`            longtext     NOT NULL,
    `md5`                varchar(32)           DEFAULT NULL,
    `gmt_create`         datetime     NOT NULL DEFAULT CURRENT_TIMESTAMP,
    `gmt_modified`       datetime     NOT NULL DEFAULT CURRENT_TIMESTAMP,
    `src_user`           text,
    `src_ip`             varchar(50)           DEFAULT NULL,
    `op_type`            char(10)              DEFAULT NULL,
    `tenant_id`          varchar(128)          DEFAULT '' COMMENT '租户字段',
    `encrypted_data_key` varchar(255)          DEFAULT NULL,
    PRIMARY KEY (`nid`),
    KEY                  `idx_gmt_create` (`gmt_create`),
    KEY                  `idx_gmt_modified` (`gmt_modified`),
    KEY                  `idx_did` (`data_id`)
) ENGINE=InnoDB DEFAULT CHARSET=utf8 COLLATE=utf8_bin COMMENT='多租户改造';


CREATE TABLE `tenant_capacity`
(
    `id`                bigint(20) unsigned NOT NULL AUTO_INCREMENT COMMENT '主键ID',
    `tenant_id`         varchar(128) NOT NULL DEFAULT '' COMMENT 'Tenant ID',
    `quota`             int(10) unsigned NOT NULL DEFAULT '0' COMMENT '配额，0表示使用默认值',
    `usage`             int(10) unsigned NOT NULL DEFAULT '0' COMMENT '使用量',
    `max_size`          int(10) unsigned NOT NULL DEFAULT '0' COMMENT '单个配置大小上限，单位为字节，0表示使用默认值',
    `max_aggr_count`    int(10) unsigned NOT NULL DEFAULT '0' COMMENT '聚合子配置最大个数',
    `max_aggr_size`     int(10) unsigned NOT NULL DEFAULT '0' COMMENT '单个聚合数据的子配置大小上限，单位为字节，0表示使用默认值',
    `max_history_count` int(10) unsigned NOT NULL DEFAULT '0' COMMENT '最大变更历史数量',
    `gmt_create`        datetime     NOT NULL DEFAULT CURRENT_TIMESTAMP COMMENT '创建时间',
    `gmt_modified`      datetime     NOT NULL DEFAULT CURRENT_TIMESTAMP COMMENT '修改时间',
    PRIMARY KEY (`id`),
    UNIQUE KEY `uk_tenant_id` (`tenant_id`)
) ENGINE=InnoDB DEFAULT CHARSET=utf8 COLLATE=utf8_bin COMMENT='租户容量信息表';


CREATE TABLE `tenant_info`
(
    `id`            bigint(20) NOT NULL AUTO_INCREMENT COMMENT 'id',
    `kp`            varchar(128) NOT NULL COMMENT 'kp',
    `tenant_id`     varchar(128) default '' COMMENT 'tenant_id',
    `tenant_name`   varchar(128) default '' COMMENT 'tenant_name',
    `tenant_desc`   varchar(256) DEFAULT NULL COMMENT 'tenant_desc',
    `create_source` varchar(32)  DEFAULT NULL COMMENT 'create_source',
    `gmt_create`    bigint(20) NOT NULL COMMENT '创建时间',
    `gmt_modified`  bigint(20) NOT NULL COMMENT '修改时间',
    PRIMARY KEY (`id`),
    UNIQUE KEY `uk_tenant_info_kptenantid` (`kp`,`tenant_id`),
    KEY             `idx_tenant_id` (`tenant_id`)
) ENGINE=InnoDB DEFAULT CHARSET=utf8 COLLATE=utf8_bin COMMENT='tenant_info';

CREATE TABLE `users`
(
    `username` varchar(50)  NOT NULL PRIMARY KEY,
    `password` varchar(500) NOT NULL,
    `enabled`  boolean      NOT NULL
);

CREATE TABLE `roles`
(
    `username` varchar(50) NOT NULL,
    `role`     varchar(50) NOT NULL,
    UNIQUE INDEX `idx_user_role` (`username` ASC, `role` ASC) USING BTREE
);

CREATE TABLE `permissions`
(
    `role`     varchar(50)  NOT NULL,
    `resource` varchar(255) NOT NULL,
    `action`   varchar(8)   NOT NULL,
    UNIQUE INDEX `uk_role_permission` (`role`,`resource`,`action`) USING BTREE
);

INSERT INTO users (username, password, enabled) VALUES ('nacos', '$2a$10$EuWPZHzz32dJN7jexM34MOeYirDdFAZm2kuWj7VEOJhhZkDrxfvUu', TRUE);
INSERT INTO roles (username, role) VALUES ('nacos', 'ROLE_ADMIN');